-0.6 -0.4 -0.2 0 0.2 0.4 0.6 0

0.5

1

1.5

2

2.5 CC Mrep Schiz-Cont, Projections on Mean Difference

Schizo’s

Controls

R^2 for Mean Diff. (%) = 1.999