-0.2 -0.15 -0.1 -0.05 0 0.05 0.1 0.15 0.2 0

1

2

3

4

5

6

7 CC Mrep Sim1-Sim3, Projections on Mean Difference

Sim 1

Sim 3

R^2 for Mean Diff. (%) = 26.7433