5 10

0

20

40

Parabolas

Raw Data

5 10

0

20

40 89.62% of Tot

Center: Mean

5 10 -10 0 10 10.38% of Tot

Center Resid.

0 5 10 0

0.5

1

PC #

R2

Standard PCA

PC R-squareds

5 10 -10 0 10 PC1 Proj.

5 10

0

20

40 86.01% of CR Center +- PC1

5 10 -10 0 10 13.99% of above Center +- PC1

-20 0 20 0

0.01

0.02

Scores kde, PC1

5 10 -10 0 10 PC2 Proj.

5 10

0

20

40 10.42% of CR Center +- PC2

5 10 -10 0 10 25.53% of above Center +- PC2

-15 -10 -5 0 5 0 0.02 0.04 0.06 0.08 Scores kde, PC2

5 10 -10 0 10 PC3 Proj.

5 10

0

20

40 0.7035% of CR Center +- PC3

5 10 -10 0 10 80.31% of above Center +- PC3

-2 0 2 0 0.1 0.2 0.3 0.4 Scores kde, PC3

5 10 -10 0 10 PC4 Proj.

5 10

0

20

40 0.6682% of CR Center +- PC4

5 10 -10 0 10 76.71% of above Center +- PC4

-2 0 2 0 0.1 0.2 0.3 Scores kde, PC4