0 2 4 0 0.1 0.2 0.3 0.4 Max value = 5.4136

Abs Skew = 2.3347

ICA 1 , Abs Skew, ir = 6

10 20 30 0 100 200 300 400 Case # of Max

10 20 30 0

2

4

Max abs data by case

0 2 4 0 0.2 0.4 0.6 Max value = 5.353

Abs Skew = 3.8814

ICA 1 , Abs Skew, ir = 906

10 20 30 0 100 200 300 400 Case # of Max

10 20 30 0 2 4 6 Max abs data by case

-1 0 1 2 3 0 0.2 0.4 0.6 0.8 Max value = 3.5119

Abs Skew = 3.249

ICA 1 , Abs Skew, ir = 736

10 20 30 0

200

400

Case # of Max

10 20 30 0 1 2 3 Max abs data by case

0 2 4 6 0

0.2

0.4 Max value = 6.1323

Abs Skew = 3.3966

ICA 1 , Abs Skew, ir = 966

10 20 30 0

200

400

Case # of Max

10 20 30 0 2 4 6 Max abs data by case

0 1 2 3 0 0.5 1

Abs Skew IC1 Gauss. test p-value = 0.030177

0 1 2 3 0 0.5 1

Abs Skew IC1 Gauss. test p-value = 0

0 1 2 3 0 0.5 1

Abs Skew IC1 Gauss. test p-value = 0.00026604

0 1 2 3 0 0.5 1

Abs Skew IC1 Gauss. test p-value = 0